ALTER TABLE `data_alarm_push_template`
    ADD COLUMN `tencent_template_id`  bigint(20) NULL COMMENT '腾讯模板id' AFTER `update_at`,
ADD COLUMN `state` int NULL COMMENT '状态 0未审核，1已审核，-1表示审核未通过或审核失败' AFTER `tencent_template_id`,
ADD COLUMN `reason` text CHARACTER SET utf8 COLLATE utf8_general_ci NULL COMMENT '失败原因' AFTER `state`;
ALTER TABLE `data_alarm_push_log` ADD COLUMN `reason` text CHARACTER SET utf8 COLLATE utf8_general_ci NULL COMMENT '失败原因';
ALTER TABLE `data_indicator_point_tag_rel`
    MODIFY COLUMN `tag_value`  varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '标签值' AFTER `tag_key`;