CREATE STABLE IF NOT EXISTS reservoir_monitoring_platform_Monitor_300423481063899137 ( `ts` timestamp ,`application_id` NCHAR(20), `DYP` DOUBLE , `P1DYP` DOUBLE , `P2DYP` DOUBLE , `P3DYP` DOUBLE , `P6DYP` DOUBLE , `P12DYP` DOUBLE , `PN01DYP` DOUBLE , `PN05DYP` DOUBLE , `PN10DYP` DOUBLE , `PN30DYP` DOUBLE ) TAGS (`info` JSON);
CREATE STABLE IF NOT EXISTS reservoir_monitoring_platform_Monitor_300423481063899138 ( `ts` timestamp ,`application_id` NCHAR(20), `RZ` DOUBLE , `FLCP` DOUBLE ) TAGS (`info` JSON);
CREATE STABLE IF NOT EXISTS reservoir_monitoring_platform_Monitor_300423481063899139 ( `ts` timestamp ,`application_id` NCHAR(20), `SPPRWM` DOUBLE , `SPPRWL` DOUBLE ) TAGS (`info` JSON);
CREATE STABLE IF NOT EXISTS reservoir_monitoring_platform_Monitor_300423481063899140 ( `ts` timestamp ,`application_id` NCHAR(20), `SPPRWL` DOUBLE , `RZ` DOUBLE ) TAGS (`info` JSON);
CREATE STABLE IF NOT EXISTS reservoir_monitoring_platform_Monitor_300423481063899141 ( `ts` timestamp ,`application_id` NCHAR(20), `XHRDS` DOUBLE , `YHRDS` DOUBLE , `VRDS` DOUBLE ) TAGS (`info` JSON);

-- 更新

ALTER STABLE reservoir_monitoring_platform_Monitor_300423481063899137 ADD COLUMN `AI` DOUBLE;
ALTER STABLE reservoir_monitoring_platform_Monitor_300423481063899137 ADD COLUMN `MST` DOUBLE;
ALTER STABLE reservoir_monitoring_platform_Monitor_300423481063899137 ADD COLUMN `UC` NCHAR(4);
ALTER STABLE reservoir_monitoring_platform_Monitor_300423481063899137 ADD COLUMN `US` DOUBLE;