ALTER TABLE `data_indicator_output_formula`
ADD COLUMN `field_group` varchar(32) NULL COMMENT '字段组，多个固定方法需要存储于同一张表时使用' AFTER `output_indicator`,
ADD COLUMN `base_point_logic` tinyint(1) NULL DEFAULT 0 COMMENT '1有基站点逻辑 0无基站点逻辑' AFTER `field_group`;
