/*
 Navicat Premium Data Transfer

 Source Server         : 192.168.10.211mysql
 Source Server Type    : MySQL
 Source Server Version : 80029
 Source Host           : 192.168.10.211:3306
 Source Schema         : dev_cloud_open

 Target Server Type    : MySQL
 Target Server Version : 80029
 File Encoding         : 65001

 Date: 30/09/2022 14:26:11
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for open_ak_sk
-- ----------------------------
DROP TABLE IF EXISTS `open_ak_sk`;
CREATE TABLE `open_ak_sk`  (
  `id` bigint(0) NOT NULL AUTO_INCREMENT,
  `access_key` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '访问id',
  `secret_key` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '秘钥key',
  `tenant_id` bigint(0) NULL DEFAULT NULL COMMENT '租户id',
  `create_time` datetime(0) NULL DEFAULT NULL COMMENT '创建时间',
  `update_time` datetime(0) NULL DEFAULT NULL COMMENT '更新时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1570310668346855427 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci COMMENT = 'api秘钥表' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
